SET FOREIGN_KEY_CHECKS=0;

ALTER TABLE `lacew_mi_prod`.`t_machine_calculation` ADD COLUMN IF NOT EXISTS  `public_note` varchar(500) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL AFTER `pan_head_type`;

SET FOREIGN_KEY_CHECKS=1;